ย้อนรอยสงครามโลกครั้งที่ 2 หัวรถจักร

แหล่งท่องเทียวเชิงประวัติศาสตร์สมัยสงครามโลกครั้งที่ 2 อำเภอละอุ่น จังหวัดระนอง

รำลึกเส้นทางรถไฟอันดามัน ระยะทางกว่า 90 กม. (ชุมพร-เขาฝาชี ) เส้นเดินทางรถไฟประวัติศาสตร์สมัยสงครามโลกครั้งที่ 2

ชมอุทยานประวัติศาสตร์สมัยสงครามโลกครั้งที่ 2 ตำบลบางแก้ว อำเภอละอุ่น จังหวัดระนอง

รถจักร

กองกำลังทหารญี่ปุ่น ได้ยกพลขึ้นบกางภาคใต้ที่ปากน้ำชุมพร ขอผ่านประเทศไทยเพื่อยกพลไปสู่สหภาพพม่าโดยใช้เส้นทางหลวงแผ่นดินหมายเลข 4 เป้นเส้นทางลำเลียงเสบียงอาหารและอาวุธยุทโธปกรณ์จากชุมพรไปยังเกาะสอง แต่การใช้เส้นทางไม่สะดวก จึงได้ก่อสร้างทางรถไฟเลียบทางหลวงแผ่นหมายเลข 4จากชุมพรมายังบริเวรเขาฝาชี (ตลาดกม.30)ระยะทาง 90.815 กิโลเมตร

รถไฟหัวรถจักร ตำบลบางแก้ว อำเภอละอุ่น จังหวัดระนอง

ประวัติความเป็นมา

ป้ายบอกรายละเอียด

รถจักร

บริเวณรอบภายในและรอบนอก ธรรมชาติรอบๆ

ปากน้ำละอุ่น เป็นแหล่งที่บรรจบของแม่น้ำ 2 สายสำคัญของละอุ่น คือ คลองละอุ่น คลองบางแก้ว มีพันธ์ปลาน้ำกร่อยอุดมสมบูรณ์ ยามหน้าหนาวเป็นแหล่งชมหิ่งห้อย ที่สวยงามในยาม ปากน้ำละอุ่นบริเวณใกล้ๆ

แหล่งท่องเที่ยวเชิงประวัติศาสตร์สมัยสงครามโลกครั้งที่ 2 แห่งนี้อยู่ในฟื้นที่บ้านเขาฝาชี ( กม.30 ) หมู่ที่4 ตำบลบางแก้ว อำเภอละอุ่น จังหวัดระนอง อยู่ติดถนนเพชรเกษม ห่างจากตัวจังหวัดตามแนวทางหลวงหมายเลข 4 ไปทางจังหวัดชุมพรประมาณ 30 กิโลเมตร อดีตฟื้นที่บริเวณมีสภาพเป็นป่าชายเลน มีไม้โกงกาง ไม้แสม และไม้ชายเลนอื่นๆ มีคลองละอุ่นเป็นลำน้ำสายหลัก ไม่มีการตั้งถิ่นฐานบ้านเรือนแต่อย่างใด

แหล่งท่องเที่ยวที่สำคัญ

บ่อน้ำพุร้อนบ่อน้ำร้อน 1 ใน 7 ของจังหวัดระนอง

คำขวัญของตำบลบางแก้ว ย้อนรอยสงคราม ชมน้ำสามสาย แลสองมหาสมุทร

ย้อนรอยสงคราม ฟื้นที่บริเวณบ้านเขาฝ่าชี (กม.30 )ซึ่งเคยเป็นฐานทัพญี่ปุ่น สมัยสงครามโลกครั้งที่ 2 มีร่องรอยหลักฐานสมัยสงครามโลก และเส้นทางรถไฟสายอันดามัน

รถจักร

น้ำพุร้อน

สัมผัสกลิ่นอายชีวิตชาวประมง ป่าชายเลนที่อดุมสมบูรณ์ บริเวณหาดโหนซึ่งซากเรือญี่ปุ่นจมอยู่หลายลำ สัมผัสกับหิ่งห้อยนับล้านๆ ตัว ดุจดั้งต้นคริสมาสต์สองฝั่งครอง

ชมน้ำสามกระแส ความน่าอัศจรรย์ของแม่น้ำสามสาย สองฝั่งประเทศที่มาบรรจบกันกับลำน้ำกระบุรี เป็นจุดชมพระอาทิคย์ ตกสวยงาม จุดหนึ่งของประเทศไทย

แหล่งสงครามโลก ครั้งที่2

หัวรถจักร

องค์การบริหารส่วนตำบลบางแก้ว เลขที่ 149/2 ม.4 ตำบลบางแก้ว อำเภอละอุ่น จังหวัดระนอง 85130 โทรศัพท์ 0-7784-7028

จัดทำโดย นางสาว อุไรวรรณ บัวชื่น ห้องสมุดประชาชนอำเภอละอุ่น จังหวัดระนอง